ZEUS

0

2500

5000

7500

10000

12500

15000

17500

20000

1.8 1.9 2 M(Kππ) (GeV)

Combinations per 10 MeV

ZEUS 1999-2000 Reflections subtracted Gauss^{mod} + Backgr. 130 Λ W Λ 300 GeV, Q^2 Λ 1 GeV^2 p_T(D^Α) Γ 3.8 GeV, |η(D^Α)| Λ 1.6 N(D^Α) = 8950 Α 600