ZEUS

0

50

100

150

200

250

300

350

0.14 0.15 0.16 0.17 M(Kππ_s) - M(Kπ) (GeV)

Combinations per 0.5 MeV

ZEUS 1998-2000 Backgr. wrong charge 130 Λ W Λ 300 GeV Q^2 Λ 1 GeV^2

p_T(D*^Α) Γ 3.8 GeV |η(D*^Α)| Λ 1.6

and p_T(D^0/D^0) Λ 3.8 GeV and p_T(D^0/D^– or |η(D^0/D^0)| Γ 1.6 or |η(D^0/D^–

N^{add}(D*^Α) = 826 Α 40

Gauss^{mod} + Backgr.