Isolated e candidates 12 < P^X_T < 25 GeV P^X_T > 25 GeV ZEUS (prel.) 99-00 (66 pb^{−1} ) 1/1.04 ± 0.11(57%) 1/0.92 ± 0.09(79%) ZEUS (prel.) 03-04 (40 pb^{−1} ) 0/0.46 ± 0.10(64%) 0/0.58^{+0.08}_{−0.09} (76%) H1 1994-2000 e^+p (104.7 pb^{−1} ) 1/1.96 ± 0.27(74%) 4/1.48 ± 0.25(86%) H1 (prel.) 1994-2005 e^± p (211 pb^{−1} ) - 11/3.2 ± 0.6(77%)