ZEUS

)^2

(GeV 2Q 310^410

)^2 (pb/GeV 2 /dQ σd

-6 10 -5 10 -4 10 -3 10 -2 10 -1 10 1 10

)^{-1} p (8.4pb - ZEUS NC (prel.) 04-05 e SM (ZEUS-S) P=+29.2%

(a)

)^2

(GeV 2Q 310^410

)^2 (pb/GeV 2 /dQ σd

-6 10 -5 10 -4 10 -3 10 -2 10 -1 10 1 10

)^{-1} p (45.1pb - ZEUS NC (prel.) 05 e SM (ZEUS-S) P=-25.9%

(b)

)^2

(GeV 2Q 310^410

(P=-25.9%) 2 /dQ σ (P=+29.2%) / d 2 /dQ σd

0 0.5 1 1.5 2 2.5 3 p^-

ZEUS NC (prel.) 04-05 e SM (ZEUS-S) P=+29.2% / P=-25.9% (c)