ZEUS

310^410

)^2 (pb/GeV 2 /dQ σd

-6 10 -5 10 -4 10 -3 10 -2 10 -1 10

)^{-1} p (35.3 pb - ZEUS CC (prel.) 05 e )^{-1} p (6.5 pb - ZEUS CC (prel.) 04-05 e

-2 10^{-1}10 1

/dx (pb) σd

10

210

310

SM (ZEUS-S) P = -25.9% SM (ZEUS-S) P = +29.2%

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9

/dy (pb) σd

0 50 100 150 200 250

)^2

(GeV 2Q

x

y

(a)

(b)

(c)