ZEUS

)^2

(GeV DA 2Q 310^410

Events

1 10 210 310 410 (a)

DAx -3 10^{-2}10^{-1}10 1

Events

1 10 210 310 (b)

DAy 0 0.2 0.4 0.6 0.8 1

Events

2000

4000

6000 (c)

(GeV) e ’E 0 10 20 30 40 50 60 70 80

Events

2000

4000

6000 (d)

(rad) eθ 0 0.5 1 1.5 2 2.5 3

Events

1 10 210 310 410 (e)

(rad) hγ 0 0.5 1 1.5 2 2.5 3

Events

1000

2000

3000

4000^2

>200 GeV 2Q ZEUS NC (prel.) )^{-1} p (53.5pb - 04-05 e NC MC

(f)

(GeV)

T,hP

0 10 20 30 40 50 60 70 80 90 100

Events

1 10 210 310 410 (g)

(cm) vtxZ

-50-40-30-20 -10 0 10 20 30 40 50

Events

1000

2000

3000

4000 (h)