ZEUS

0 10 20 30 40 50 60 70 80 90 100

Events

0 100 200 300 400 500 600

0 310^410^510

Events

0 100 200 300 400 500

0

-210^{-1}10 1

Events

0 100 200 300 400 500 600 700

0 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9

Events

0 100 200 300 400 500 600

0

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

Events

0 100 200 300 400 500 600

0

600 2

> 200 GeV 2Q ZEUS CC (prel.) )^{-1} p (35.3 pb - 05 e SM MC P = -25.9%

-50 -40 -30 -20 -10 0 10 20 30 40 50

Events

0 100 200 300 400 500

0

(GeV)

T,miss

P )^2 (GeV_{JB}^2Q

JBx_{JB}y

T / E T,miss

P (cm)_{vtx}Z

(a) (b)

(c) (d)

(e) (f)