ZEUS

0 100 200 300 400 500

3 3.2 3.4 3.6

Combinations per 10 MeV

(a) D*^Α 5 (Kπ)π_s backgr. fit fit interpol.

0 100 200 300 400 500

3 3.2 3.4 3.6

(b) ZEUS 95-00

D*^Α 5 (Kπππ)π_s sum of interpol. and MC signal

0 20 40 60 80

3 3.2 3.4 3.6

(c) Q^2 Γ 1 GeV^2 D*^Α 5 (Kπ)π_s

0 20 40 60 80

3 3.2 3.4 3.6

(d) Q^2 Γ 1 GeV^2

D*^Α 5 (Kπππ)π_s

M(D^∗p) = ΔM^{ext} + M(D^{∗+})_{PDG} (GeV)