ZEUS

0 25 50 75 100

2.9 3 3.1 3.2 3.3 3.4 3.5 3.6

Combinations per 10 MeV

(a) ZEUS 1995-2000, Q^2 Γ 1 GeV^2 D*^Α 5 (Kπ)π_s like-sign combinations

0 5 10 15

2.9 3 3.1 3.2 3.3 3.4 3.5 3.6

(b) P(p) Λ 1.35 GeV, dE/dx(p) Γ 1.3 mips

0 10 20 30

2.9 3 3.1 3.2 3.3 3.4 3.5 3.6 M(D^∗p) = ΔM^{ext} + M(D^{∗+})_{PDG} (GeV)

(c) P(p) Γ 2 GeV