ZEUS

0 1 2 3 4 5 6 7

10^{-1} 1 10 dE/dx (mips)

(a)

π

K p ZEUS 1995-2000

D*^Α 5 (Kπ)π_s M(D*p) Λ 3.6 GeV

0 1 2 3 4 5 6

10^{-1} 1 10 P (GeV)

(b)

π

K p_{D*Α 5 (Kπππ)πs} M(D*p) Λ 3.6 GeV