ZEUS

0.2

0.25

0.3

0.35

0.4

0.45

0.5

10^2 10^3

Q^2 (GeV^2)

(dσ/dQ^2)_{trijets} / (dσ/dQ^2)_{dijets}

ZEUS (prel.) 98-00 Energy Scale Uncertainty NLO (1 + δ_{hadr}) : 1/16 Λ μ_r^2 / (Q^2+E^–_T^2) Λ 1

M_{n-jet} Γ 25 GeV