ZEUS

)(GeV) πΞ M( 1.4 1.6 1.8 2 2.2 2.4 2.6 2.8

Entries / 7.5MeV

0 20 40 60 80 100 120 140 160 180

anticipated NA49 signal

ZEUS (prel.) 96-00 Fit

34± candidates=162 1.4 MeV ± peak=1533.5 2.4 MeV ± =7.6 σ

2 >1 GeV 2Q

(1530) 0Ξ