/Q OUT K 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

Events

1

10

10^2

10^3

10^4_{ZEUS (prel.) 98-00}

LEPTO ))+NLL+PC 3 Sα LO(O( 2 < 500 GeV 2 100 < Q 2 < 800 GeV 2 500 < Q

ZEUS