ZEUS

0 0.005

0.01

0.015

0.02

20 40 60 80 100

Q^2 (GeV^2) dσ/dQ^2 (nb/GeV^2)

ZEUS (prel.) 98-00 ARIADNE LEPTO CASCADE s.1 CASCADE s.2

0

100

200

0.0025 0.005

Jet energy scale

x_{Bj} dσ/dx_{Bj} (nb)

10^{-3}

10^{-2}

10^{-1}

6 8 10 12 14

E^{jet}_T (GeV) dσ/dE^{jet}_T (nb/GeV)

0

0.2

0.4

0.6

2 2.5 3 3.5

η^{jet} dσ/dη^{jet} (nb)