1.45 1.5 1.55 1.6 1.65 1.7 0 50 100 150 200 250 300 350

/ ndf =48 / 45 2χ 1 MeV ± peak=1522 39 ± events=184

2 >20 GeV 2Q

(a)

ZEUS (prel.) 96-00 Fit Background

1.45 1.5 1.55 1.6 1.65 1.7 0

50

100

150

200

250

/ ndf =59 / 45 2χ 1 MeV ± peak=1522 33 ± events=139

2 >30 GeV 2Q

(b)

1.45 1.5 1.55 1.6 1.65 1.7 0 20 40 60 80 100 120 140 160 180

/ ndf =62 / 45 2χ 1 MeV ± peak=1522 29 ± events=118

2 >40 GeV 2Q

(c) 1.45 1.5 1.55 1.6 1.65 1.7 0 20 40 60 80 100 120 140 160

/ ndf =55 / 45 2χ 1 MeV ± peak=1523 26 ± events=105

2 >50 GeV 2Q

(d)

ZEUS

M (GeV)

Combinations/0.005 GeV