ZEUS_Q2_{(GeV}2_)

150 - 1200

50 - 150

25 - 50

X_{BJ} 6.0-12.0x10^{-4} 1.2-2.4x10^{-3} 2.4-10.0x10^{-3} 1.0-10.0x10^{-2}

ARIADNE for all bins ARIADNE in each bin LEPTO in each bin

ZEUS (prel.) 96-97

ZEUS

5

10

15

10

5

10

15

10

5

10

15

Λn_{ch}Γ

5

10

15

10

5

10

15

10

5

10

15

10

5

10

15

10 5

10

15

10 5

10

15

10 M_{eff}