ZEUS

4

6

8

10

12

14

16

18

5 6 7 8 9 10 20 30 40

M_{eff} (GeV)

Λn_{ch}Γ

ZEUS (prel.) 96-97 Lab Frame ZEUS (prel.) 96-97 Current Region Breit Frame

ZEUS (prel.) 96-97 Target Region Breit Frame Ariadne-Target Region Ariadne-Current Region