ZEUS

0

5

10

15

20

25

30

10 10^2

Energy Scale (GeV)

Λn_{ch}Γ

ZEUS (prel.) 96-97 Current Region Breit Frame (x2) (2*E_{current}) ZEUS 94-97 Current Region Breit Frame (x2) (Q) Ariadne

pp ISR (Ρ(q^2)_{had}) LEP I (Ρs_{e+e-}) LEP II (Ρs_{e+e-}) e^+e^- TASSO (Ρs_{e+e-}) e^+e^- PLUTO (Ρs_{e+e-}) e^+e^- JADE (Ρs_{e+e-}) e^+e^- MARK I (Ρs_{e+e-})