0

5

10

15

20

-410^{-3}10^{-2}10^{-1}10 1 0

5

x xg

2 = 5 GeV 2Q

2 = 20 GeV 2Q

2 = 200 GeV 2Q

0

5

20 ZEUS-JETS (prel.) 94-00 H1 PDF 2000

total uncert. exp. uncert. total uncert.

H1+ZEUS