τD 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

Events

1

10

10^2

p 94-00 ± ZEUS (prel.) e Background MC m=240 (GeV) τ LFV

m=600 (GeV) τ LFV

ϕΔ 0 20 40 60 80 100 120 140 160 180

Events

1

10

10^2

ZEUS