(GeV) Z E-P 0 10 20 30 40 50 60 70 80 90 100

Events

1

10

(GeV) tP 15 20 25 30 35 40 45 50 55

Events

1

10 p 94-00 ± ZEUS (prel.) e Background MC

m=240 GeV μ LFV

1/2 (GeV) tE/_tP

2 2.5 3 3.5 4 4.5 5 5.5 6

Events

1

10

μθ 0 20 40 60 80 100 120 140 160

Events

1

10

ZEUS