ZEUS

10^{-2}

10^{-1}

1

120 140 160 180 200 220 240

M_{stop} (GeV) λ^‘_{131}

Excluded at 95% CL

λ^‘_{131} (APV)

ZEUS (prel.) 99-00 e^+p μ=800 GeV, M_{stop} - M_{χ+} =20 GeV M_1=110 GeV, M_3=1 TeV

tanβ=2 tanβ=5 tanβ=10