ZEUS

ZEUS (prel.) 99-00 longitudinal LCWF (BFGMS) transverse LCWF (BFGMS) Λ Q^2 Γ = 3.1 GeV^2 u dσ/du (arbitrary units)

0

50

100

150

200

250

300

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1