ZEUS

200 400 600 800 1000

0.25 0.5 0.75

NLO (R=1) NLO (R=1) 0 had. H1 2002 fit (prel.)

dσ/dx^{obs}_γ (pb)

0.5 1.0 1.5 2.0

0.25 0.5 0.75

(dσ/dx^{obs}_γ )_{data} / (dσ/dx^{obs}_γ )_{NLO}

200 400 600 800 1000

0.25 0.5 0.75 1

ZEUS (prel.) 99-00 Energy scale uncertainty NLO (R=0.34) NLO (R=0.34) 0 had. H1 2002 fit (prel.)

0.001

0.5008

1.0006

1.5004

2.0002 2.5

0.25 0.5 0.75 1 x^{obs}_γ