ZEUS

5

10

15

15 20 25 30 35 40 45 50

ZEUS (prel.) 99-00 Energy scale uncertainty RAPGAP H1 Fit 2 Ξ 0.52 resolved only

M_X (GeV) dσ/dM_X (pb/GeV)

100 200 300 400 500 600 700

0.25 0.5 0.75 1

x^{obs}_γ dσ/dx^{obs}_γ (pb)

0.5 1 1.5 2

0.25 0.5 0.75 1

x^{obs}_γ

(dσ/dx^{obs}_γ )_{data} / (dσ/dx^{obs}_γ )_{MC}

50 100 150 200 250 300 350 400 450 500

0.2 0.4 0.6 0.8 1

z^{obs}_{IP} dσ/dz^{obs}_{IP} (pb)