ZEUS

100 200 300 400 500 600

0.2 0.33 0.46 0.59 0.72 0.85

ZEUS (prel.) 99-00 Energy scale uncertainty RAPGAP H1 Fit 2 Ξ 0.52 resolved only

y dσ/dy (pb)

2000

4000

6000

8000

10000

0 0.007 0.014 0.021 0.028 0.035

x_{IP} dσ/dx_{IP} (pb)

1

10

10^2

7.5 9.5 11.5 13.5 15.5 17.5

E^{jet1}_T (GeV) dσ/dE^{jet1}_T (pb/GeV)

20 40 60 80 100 120 140

-1.5 -1 -0.5 0 0.5 1 1.5 2

η^{jet1} dσ/dη^{jet1} (pb)