0.0 10. 20. 30. 40. 50. 60. 70. 80. 90. 100. 110. 120. s (m) δE/ p0c = 0. Table name = TWISS

Proton Optics hp_rev1.mad HP/UX version 8.21/5 07/05/97 14.34.42

0.0 5. 10. 15. 20. 25. 30. 35. 40. 45. 50.

β^{1/2} (m^{1/2})

βx^{1/ 2} βy^{1/ 2}