0.0 20. 40. 60. 80. 100. 120. s (m) δE/ p0c = 0. Table name = TWISS he_rev1.mad em=22nm cf=.18 bst=.63,.26m g=7.6,6.8T/m dt=3.66,4.34mr HP/UX version 8.21/5 07/05/97 14.35.41

0.0 2. 4. 6. 8. 10. 12. 14. 16. 18. 20.

β^{1/2} (m^{1/2})

βx^{1/ 2} βy^{1/ 2}