0 1 2 3 4 5 6 7 8 1 2 3 4 5 6 7 8 9 / ndf

2χ 3.132 / 2 Prob 0.2089 p0 1.255 ± 0.01 p1 0.2236 ± 1.03 ± ±

p0 1.5 − 1− 0.5− 0 0.5 1 1.5 p1

0.8

0.9

1

1.1

1.2

1.3 corr = -0.980