Q^2 = 5 (GeV/c)^2 F_{2,c}^{exact} F_{2,c}^{VFNS} F_{2,c}^{PDF} F_{2,c}^{asymp}

x Fig.12b 0

0.05

0.1

0.15

0.2

0.25

0.3

10^{-4} 10^{-3} 10^{-2} 10^{-1} 1