0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

1 10 8

1 10 7

1 10 6

1 10 5

1 10 4

1 10 3

0.01

0.1

NHL Mass (GeV)

M ix in g St re ng th U Ds( ),M 50^2

U Ds( ),M 200^2

U Ds( ),M 100^2

U DsH( ),M 100^2

M