1.21.00.80.60.40.20.0

s

T

(pb)6x10-2

54321l’131 HERA data Excluded region

Br(ed)=1.0

Br(ed)=0.5

Br(ed)=0.3

e^+p → t_1X→ e^+qX

s = 300GeV

Q^2 > 15,000GeV^2

m_{t1} = 200GeV θ_t = 0.0