CJC2 current history

10^{-1}

1

10

100 200 300 400 500 600 700 days from 1.1.2002

( CJC2 - I_0 - SR ) / ( Sep ‘02 parameterization e-gas + p-gas )

10^{-1}

1

10 I_eI_p Λ 150 mA^2 I_eI_p Λ 500 mA^2 I_eI_p Γ 500 mA^2 I_eI_p Γ 1000 mA^2

τ = 100 days leak NL 11m GO/GG 110K 170K leak NR 11m

leak NL 11m

for 5000 mA^2

DP 06/12/2003 16.37.37