H1 CJC2 currents

0 25 50 75 100 125

150 175 200 225 250

0 10 20 30 40 50 60 70 I_e (I_p) ΜmAΝ

I_{CJC2} ΜμAΝ e^+ only, 11.9. e^+, 25.9. e^+, 24.11. 170K p only ep at I_p = 30 mA, June ep 30 mA, after 17.9.02 ep 30 mA, GG 110K, Oct ep 30 mA, GG 125K, Nov 11 ep 30 mA, GG 170K, Nov 18 ep 30 mA, GG 55K, Nov 26, 29 ep 30 mA, GG 55K, Dec 8