Stable positron beam in lumi optics on 4.8.2002 (8ϑ20 5 13ϑ00)

0

10

20

30

40

50

60

0 2 4 6 8 10 12 14 16 18 20 Positron beam current ΜmAΝ

CJC2 current ΜμAΝ

P1 14.01 P2 1.678 P3 0.1235E-01

0

10

20

30

40

50

60

0 2 4 6 8 10 12 14 16 18 20 Positron beam current ΜmAΝ

CJC1 current ΜμAΝ

P1 6.990 P2 1.359 P3 0.7135E-01