HERA-B P.Buchholz

HERA-B Request for Proton Running

6 shifts of proton running requested before Christmas

• 2 shifts per week,

• 3 shifts to establish:

– multi-wire target operation, – VDS operation, – detector synchronisation.

• 3 shifts to accumulate data for:

– calibration and alignment of

tracker/VDS and ECAL.

• bare minimum of time needed • will save several weeks next year • about 10 % of available time only !

• parasitic running acceptable, if:

2 days advance notice, since experts required, sufficient successful running time as requested above

HERA Meeting 4.12.2001 1