HERA-B P.Buchholz

HERA-B Request for Proton Running

• 4 shifts of dedicated proton running

requested as soon as possible. – 2 shifts to re-establish:

∗ multi-wire target operation, ∗ VDS operation, ∗ detector synchronisation.

– 2 shifts to accumulate data for:

∗ continuation of calibration and alignment of tracker/VDS and

ECAL.

• Parasitic running before Christmas

very successful and valuable.

– All subdetector groups have largely profited and achieved their

goals.

• No conflicts with the HERA tuning or the other experiments.

• Continuation of parasitic proton running of vital importance for HERA-B:

– clear program for final commissioning, e.g.:

∗ ECAL π^0 calibration, ∗ new SLT and FLT commissioning,

• Gain of time optimizes data taking in 2002.

HERA Meeting 9.4.2002 1