Measured and Expected CJC 2 Currents

0 25 50 75 100 125 150 175 200 225 250

-22.5 -20 -17.5 -15 -12.5 -10 -7.5 -5 -2.5 0

2005/09/10 14.46

Last day Μ 24 hours back from now Ν

CJC 2 current Μ mA Ν

0 25 50 75 100 125 150 175 200 225 250

-7 -6 -5 -4 -3 -2 -1 0 Last week Μ 7 days back from now Ν

CJC 2 current Μ mA Ν