Beam currents

0 10 20 30 40 50 60 70 80 90 100 110 120

0 25 50 75 100 125 150 175 200 225 250 days in 2005 beam current ΜmAΝ

0 10 20 30 40 50 60 70 80 90 100 110 120

DP 15/08/2005 17.26.33