Luminosity in 2005

0 25 50 75 100 125 150 175 200 225 250

0 50 100 150 200 250 300 350 days from 1.1.2005

Integrated luminosity Μpb^{-1}Ν

0 25 50 75 100 125 150 175 200 225 250

helicity flip shutdown

H1 runs H1 active CJC1+2 + CIP HV on

DP 12/07/2005 09.05.06