Specific luminosity in 2005

0

200

400

600

800

1000

1200

1400

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 2.2 2.4

Entries 582

Luminosity weighted

Run-averaged specific luminosity Μ10^{30}/cm^2/s/mA^2Ν

Run luminosity Μnb^{-1}Ν

Standard tunes May 05 ΛL_{spec}Γ = 1.64

Mirror tunes Jun 05 ΛL_{spec}Γ = 1.40

DP 20/06/2005 16.52.34