HV efficiency in 2005

I_e (mA)

L(H1 CDAQ) /pb

Total Lumi pb^{-1} until 24.5. : 70.5 since 24.5. : 1.4

I_e (mA) ε (HV on) ε_{CJC1,2 CIP on} (%)

until 24.5. : 56 since 24.5. : 37.6

0 1 2 3 4 5 6 7

10 15 20 25 30 35 40

0 0.2 0.4 0.6 0.8 1 1.2

10 15 20 25 30 35 40

HV efficiency in 2005

Lumi Fills until last Week average ε (HV on)

Lumi Fills of last Week average ε (HV on)

Total Loss (%) until 24.5. : 44 since 24.5. : 62.4

I_e (mA)

Lost Luminosity (%)

0 0.2 0.4 0.6 0.8 1

3600 3700 3800 0 0.2 0.4 0.6 0.8 1

3860 3865 3870

0 2 4 6 8 10 12

10 15 20 25 30 35 40

Time Dependence of Proton Background in 2005

proton contribution (FTT)

Day of 2005

Normalised FTT Rate goal

0

0.5

1

1.5

2

2.5

3

3.5

4

4.5

20 40 60 80 100 120 140

Time Dependence of Proton Background in 2005

proton contribution (FTT)

Day of 2005

Normalised FTT Rate goal

0

0.5

1

1.5

2

2.5

3

3.5

4

4.5

125 130 135 140 145 150 155