Luminosity in 2005

0

1

2

3

4

5

6

7

8

0 2.5 5 7.5 10 12.5 15 17.5 20 22.5 25 days from 1.1.2005

Integrated luminosity Μpb^{-1}Ν

0

1

2

3

4

5

6

7

8 H1 runs H1 active CJC2 HV on

DP 24/01/2005 13.55.03