H1 luminosity in 2005

0 25 50 75 100 125 150 175 200 225 250

0 30 60 90 120 150 180 210 240 270 300 330 360 days from 1.1.2005

Integrated luminosity Μpb^{-1}Ν

0 25 50 75 100 125 150 175 200 225 250

helicity flips shutdown

HERA produced H1 DAQ After lumi and bg tuning After deadtime CJC1+2 + CIP HV on

DP 01/11/2005 08.43.02