H1 p-gated BToF rate vs beam current product

0

20

40

60

80

100

120

140

0 200 400 600 800 1000 1200 1400 1600 1800 2000 0

20

40

60

80

100

120

140

I_e * I_p ΜmA^2Ν p-gated BToF rate ΜkHzΝ

6.12.2004

7.7.2004 limit for CJC operation

DP 06/12/2004 17.31.24