H1 CJC2 current history

0.5 0.6 0.7 0.8 0.9 1

2

3 4 5 6 7 8 9

-100 -75 -50 -25 0 25 50 75 100 125 Oct 2003 - Apr 2004 days from 1.1.2004

( CJC2 - I_0 - SynRad of Dec 2003 ) / ( e-gas + p-gas of Feb 2004)

I_eI_p Λ 500 mA^2 I_eI_p Λ 1000 mA^2 I_eI_p Λ 2000 mA^2 I_eI_p Γ 2000 mA^2 leak NL 11m

for 5000 mA^2

DP 11/05/2004 08.36.29