H1 CJC2 10./11.5.2004

0 20 40 60 80 100 120 140 160 180 200

0 500 1000 1500 2000 2500 3000 3500 4000 I_e * I_p ΜmA^2Ν

CJC2 current ΜμAΝ

ENTRIES 3335 I_p = 92 mA

expectation

DP 11/05/2004 08.39.51