H1 CJC current vs p-gated BToF rate

0 25 50 75 100 125 150 175 200 225 250

0 10 20 30 40 50 60 70 0 25 50 75 100 125 150 175 200 225 250

p-gated BToF rate ΜkHzΝ

CJC2 current ΜμAΝ

7.7.2004

20.12.2004 limit

DP 20/12/2004 16.53.23