TPOL runs 26287 to 26322 taken 27/01/4-20:55:55 to 27/01/4-22:04:12

table(x) lpol table(x) ratio table(x) lumi table(x) deltaS1 table(x) focus table(x) beampos table(x) table(y)+beam table(x)

HV(U,D,L,R) table(x) mirror M3(H,V)

32.5 35 37.5 40 42.5

-25 0 25 1 1.1 1.2 1.3

-25 0 25 40 60 80 100

-25 0 25

4 6 8 10

-25 0 25

0.55

0.575 0.6 0.625

0.65

-25 0 25

-0.04

-0.02 0 0.02

0.04

-25 0 25

-9.1 -9 -8.9

-8.8

-8.7

-25 0 25

1040

1060

1080

-25 0 25 1.6 1.7 1.8

-25 0 25