0 20 40 60

11 12 13 14 15 16 17

0 20 40 60

11 12 13 14 15 16 17

0.6 0.8 1 1.2 1.4

11 12 13 14 15 16 17

LPol %

10.02.04-16.02.04

TPol %

LPOL/TPOL Ratio

Days

Current mA

0 10 20 30

11 12 13 14 15 16 17